-2 10^{-1}10 1

0.02

0.04

0.06

2 =8.0 GeV 2Q

xp=0.015

-2 10^{-1}10 1

0.02

0.04

0.06

2 =20.0 GeV 2Q

xp=0.015

-2 10^{-1}10 1

0.02

0.04

0.06

2 =38.0 GeV 2Q

xp=0.015

-2 10^{-1}10 1

0.02

0.04

0.06

2 =70.0 GeV 2Q

xp=0.015

2 =8.0 GeV

xp=0.000

2 =20.0 GeV

xp=0.000

2 =38.0 GeV 2 2 2 2 2 2 2 2 2