10^210

200

400

600

800

1000

1200

1400

=0.0071 β

xp=0.015

10^210

200

400

600

800

1000

1200

1400

=0.0316 β

xp=0.015

10^210

200

400

600

800

1000

1200

1400

=0.1259 β

xp=0.015

10^210

200

400

600

800

1000

1200

1400

=0.5012 β

xp=0.015

=0.0071 β

xp=0.000

=0.0316 β =0.1259 β β β β β β β β β β