-2 10^{-1}10 1

50

100

150_2 =5.5 GeV 2Q

xp=0.010

-2 10^{-1}10 1

50

100

150_2 =10.5 GeV 2Q

xp=0.010

-2 10^{-1}10 1

50

100

150_2 =17.0 GeV 2Q

xp=0.010

-2 10^{-1}10 1

50

100

150_2 =24.0 GeV 2Q

xp=0.010

-2 10^{-1}10 1

50

100

150_2 =37.0 GeV 2Q

xp=0.010

-2 10^{-1}10 1

50

100

150_2 =65.0 GeV 2Q

xp=0.010

-2 10^{-1}10 1

50

100

150_2 =5.5 GeV 2Q

xp=0.013

-2 10^{-1}10 1

50

100

150_2 =10.5 GeV 2Q

xp=0.013

-2 10^{-1}10 1

50

100

150_2 =17.0 GeV 2Q

xp=0.013

-2 10^{-1}10 1

50

100

150_2 =24.0 GeV 2Q

xp=0.013

-2 10^{-1}10 1

50

100

150_2 =37.0 GeV 2Q

xp=0.013

-2 10^{-1}10 1

50

100

150_2 =65.0 GeV 2Q

xp=0.013

-2 10^{-1}10 1

50

100

150_2 =5.5 GeV 2Q

xp=0.017

-2 10^{-1}10 1

50

100

150_2 =10.5 GeV 2Q

xp=0.017

-2 10^{-1}10 1

50

100

150_2 =17.0 GeV 2Q

xp=0.017

-2 10^{-1}10 1

50

100

150_2 =24.0 GeV 2Q

xp=0.017

-2 10^{-1}10 1

50

100

150_2 =37.0 GeV 2Q

xp=0.017

-2 10^{-1}10 1

50

100

150_2 =65.0 GeV 2Q

xp=0.017

-2 10^{-1}10 1

50

100

150_2 =5.5 GeV 2Q

xp=0.022

-2 10^{-1}10 1

50

100

150_2 =10.5 GeV 2Q

xp=0.022

-2 10^{-1}10 1

50

100

150_2 =17.0 GeV 2Q

xp=0.022

-2 10^{-1}10 1

50

100

150_2 =24.0 GeV 2Q

xp=0.022

-2 10^{-1}10 1

50

100

150_2 =37.0 GeV 2Q

xp=0.022

-2 10^{-1}10 1

50

100

150_2 =65.0 GeV 2Q

xp=0.022