0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2 =5.5 GeV 2Q =0.0050 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2 =5.5 GeV 2Q =0.0112 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2 =5.5 GeV 2Q =0.0224 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2 =5.5 GeV 2Q =0.0447 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2 =5.5 GeV 2Q =0.0891 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2 =5.5 GeV 2Q =0.1778 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2 =5.5 GeV 2Q =0.3548 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2 =5.5 GeV 2Q =0.7079 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=10.5 GeV 2Q =0.0050 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=10.5 GeV 2Q =0.0112 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=10.5 GeV 2Q =0.0224 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=10.5 GeV 2Q =0.0447 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=10.5 GeV 2Q =0.0891 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=10.5 GeV 2Q =0.1778 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=10.5 GeV 2Q =0.3548 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=10.5 GeV 2Q =0.7079 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=17.0 GeV 2Q =0.0050 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=17.0 GeV 2Q =0.0112 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=17.0 GeV 2Q =0.0224 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=17.0 GeV 2Q =0.0447 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=17.0 GeV 2Q =0.0891 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=17.0 GeV 2Q =0.1778 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=17.0 GeV 2Q =0.3548 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=17.0 GeV 2Q =0.7079 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=24.0 GeV 2Q =0.0050 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=24.0 GeV 2Q =0.0112 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=24.0 GeV 2Q =0.0224 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=24.0 GeV 2Q =0.0447 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=24.0 GeV 2Q =0.0891 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=24.0 GeV 2Q =0.1778 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=24.0 GeV 2Q =0.3548 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=24.0 GeV 2Q =0.7079 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=37.0 GeV 2Q =0.0050 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=37.0 GeV 2Q =0.0112 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=37.0 GeV 2Q =0.0224 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=37.0 GeV 2Q =0.0447 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=37.0 GeV 2Q =0.0891 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=37.0 GeV 2Q =0.1778 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=37.0 GeV 2Q =0.3548 β

0 0.01 0.02 0.03

0.5

1

1.5

1

1.5^2

=37.0 GeV 2Q =0.7079 β

0 0.01 0.02 0.03

0.5 1 1.5 1 1.5 2

=65.0 GeV 2Q =0.0050 β

0 0.01 0.02 0.03

0.5 1 1.5 1 1.5 2

=65.0 GeV 2Q =0.0112 β

0 0.01 0.02 0.03

0.5 1 1.5 1 1.5 2

=65.0 GeV 2Q =0.0224 β

0 0.01 0.02 0.03

0.5 1 1.5 1 1.5 2

=65.0 GeV 2Q =0.0447 β

0 0.01 0.02 0.03

0.5 1 1.5 1 1.5 2

=65.0 GeV 2Q =0.0891 β

0 0.01 0.02 0.03

0.5 1 1.5 1 1.5 2

=65.0 GeV 2Q =0.1778 β

0 0.01 0.02 0.03

0.5 1 1.5 1 1.5 2

=65.0 GeV 2Q =0.3548 β

0 0.01 0.02 0.03

0.5 1 1.5 1 1.5 2

=65.0 GeV 2Q =0.7079 β