10^210

1000

2000

3000

4000

5000

=0.0050 β xp=0.010

10^210

1000

2000

3000

4000

5000

=0.0112 β xp=0.010

10^210

1000

2000

3000

4000

5000

=0.0224 β xp=0.010

10^210

1000

2000

3000

4000

5000

=0.0447 β xp=0.010

10^210

1000

2000

3000

4000

5000

=0.0891 β xp=0.010

10^210

1000

2000

3000

4000

5000

=0.1778 β xp=0.010

10^210

1000

2000

3000

4000

5000

=0.3548 β xp=0.010

10^210

1000

2000

3000

4000

5000

=0.7079 β xp=0.010

10^210

1000

2000

3000

4000

5000

=0.0050 β xp=0.013

10^210

1000

2000

3000

4000

5000

=0.0112 β xp=0.013

10^210

1000

2000

3000

4000

5000

=0.0224 β xp=0.013

10^210

1000

2000

3000

4000

5000

=0.0447 β xp=0.013

10^210

1000

2000

3000

4000

5000

=0.0891 β xp=0.013

10^210

1000

2000

3000

4000

5000

=0.1778 β xp=0.013

10^210

1000

2000

3000

4000

5000

=0.3548 β xp=0.013

10^210

1000

2000

3000

4000

5000

=0.7079 β xp=0.013

10^210

1000

2000

3000

4000

5000

=0.0050 β xp=0.017

10^210

1000

2000

3000

4000

5000

=0.0112 β xp=0.017

10^210

1000

2000

3000

4000

5000

=0.0224 β xp=0.017

10^210

1000

2000

3000

4000

5000

=0.0447 β xp=0.017

10^210

1000

2000

3000

4000

5000

=0.0891 β xp=0.017

10^210

1000

2000

3000

4000

5000

=0.1778 β xp=0.017

10^210

1000

2000

3000

4000

5000

=0.3548 β xp=0.017

10^210

1000

2000

3000

4000

5000

=0.7079 β xp=0.017

10^210

1000

2000

3000

4000

5000

=0.0050 β xp=0.022

10^210

1000

2000

3000

4000

5000

=0.0112 β xp=0.022

10^210

1000

2000

3000

4000

5000

=0.0224 β xp=0.022

10^210

1000

2000

3000

4000

5000

=0.0447 β xp=0.022

10^210

1000

2000

3000

4000

5000

=0.0891 β xp=0.022

10^210

1000

2000

3000

4000

5000

=0.1778 β xp=0.022

10^210

1000

2000

3000

4000

5000

=0.3548 β xp=0.022

10^210

1000

2000

3000

4000

5000

=0.7079 β xp=0.022