[GeV/c] T Jet p

20 40 60 80 100 120 140 160 180 200 220 240

b-jet Efficiency

0.4 0.45 0.5 0.55 0.6 0.65 0.7 0.75 0.8 0.85 0.9 Expected Counting System8

-1 CMS preliminary 10 pb

Stat. errors only